0 2 4 6 8 10 12 14 16 18 20 0 0.2 0.4 0.6 Third sensor fault

0 2 4 6 8 10 12 14 16 18 20 0 0.2 0.4 Third sensor fault reconstruction

0 2 4 6 8 10 12 14 16 18 20

-0.05 0 0.05 0.1

Time (sec)

Reconstruction error